http://www.esd.ornl.gov/~hnw/esri98

Bill Hargrove hnw@ornl.gov

Forrest Hoffman forrest@esd.ornl.gov

high soil N high soil OM high soil water few degree-days heat many degree-days cold

high solar input high elev shallow water table

low precip

0.95

-0.92

0.89

0.89

0.42

-0.85

0.84

0.72

0.64

"Plant Nutrients"

"Physiographic Position"

"Temperature"

Factor 3

Factor 1

Factor 2

high precip low solar input low elev deep water table low soil N low soil OM low soil water many degree-days heat few degree-days cold